\section{Copy dot tex}


EN61508:6\cite{en61508}[B.6.6]
describes FMEA as: 
\begin{quotation}
"To analyse a system design, by examining all possible sources of failure
of a system's components and determining the effects of these failures
on the behaviour and safety of the system."
\end{quotation}.

sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
sample text
